[{"id":"1092","mr_state":["X","Multirule belum berlaku [Hasil Qualitative] ",[]],"validation":"Y","test_id":"0","test_name":"Paket 1"},{"id":"1092","mr_state":["X","Multirule belum berlaku [Hasil Qualitative] ",[]],"validation":"Y","test_id":"448","test_name":"Urine Lengkap"},{"id":"1093","mr_state":["X","Multirule Warna (Urine Lengkap)|tidak berlaku [Result not numeric]",[],{"title":"Multirule Warna (Urine Lengkap)","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"449","test_name":"Warna (Urine Lengkap)"},{"id":"1094","mr_state":["X","Multirule Kejernihan (Urine Lengkap)|tidak berlaku [Result not numeric]",[],{"title":"Multirule Kejernihan (Urine Lengkap)","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"450","test_name":"Kejernihan (Urine Lengkap)"},{"id":"1095","mr_state":["Y","Multirule BJ Urine|terpenuhi [Normal, pKa CHANGE ION CONS.]",[],{"title":"Multirule BJ Urine","sub_title":"Terpenuhi, BJ Urine untuk kondisi Normal dengan methode pKa CHANGE ION CONS. tidak memiliki reflex test."}],"validation":"Y","test_id":"451","test_name":"BJ Urine"},{"id":"1096","mr_state":["Y","Multirule pH Urine|terpenuhi [Normal, pH INDICATOR]",[],{"title":"Multirule pH Urine","sub_title":"Terpenuhi, pH Urine untuk kondisi Normal dengan methode pH INDICATOR tidak memiliki reflex test."}],"validation":"Y","test_id":"452","test_name":"pH Urine"},{"id":"1097","mr_state":["X","Multirule Protein (Albumin) Urine|tidak berlaku [Result not numeric]",[],{"title":"Multirule Protein (Albumin) Urine","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"453","test_name":"Protein (Albumin) Urine"},{"id":"1098","mr_state":["X","Multirule Glukosa Urine|tidak berlaku [Result not numeric]",[],{"title":"Multirule Glukosa Urine","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"454","test_name":"Glukosa Urine"},{"id":"1099","mr_state":["X","Multirule Keton|tidak berlaku [Result not numeric]",[],{"title":"Multirule Keton","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"455","test_name":"Keton"},{"id":"1100","mr_state":["X","Multirule Bilirubin urine|tidak berlaku [Result not numeric]",[],{"title":"Multirule Bilirubin urine","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"456","test_name":"Bilirubin urine"},{"id":"1101","mr_state":["X","Multirule Urobilinogen|tidak berlaku [Result not numeric]",[],{"title":"Multirule Urobilinogen","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"457","test_name":"Urobilinogen"},{"id":"1102","mr_state":["X","Multirule Nitrit (Urine Lengkap)|tidak berlaku [Result not numeric]",[],{"title":"Multirule Nitrit (Urine Lengkap)","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"458","test_name":"Nitrit (Urine Lengkap)"},{"id":"1103","mr_state":["X","Multirule Urine Blood (Urine Lengkap)|tidak berlaku [Result not numeric]",[],{"title":"Multirule Urine Blood (Urine Lengkap)","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"459","test_name":"Urine Blood (Urine Lengkap)"},{"id":"1104","mr_state":["X","Multirule Lekosit Esterase (Urine Lengkap)|tidak berlaku [Result not numeric]",[],{"title":"Multirule Lekosit Esterase (Urine Lengkap)","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"460","test_name":"Lekosit Esterase (Urine Lengkap)"},{"id":"1106","mr_state":["X","Multirule Eritrosit (Sedimen)|tidak berlaku [Result not numeric]",[],{"title":"Multirule Eritrosit (Sedimen)","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"462","test_name":"Eritrosit (Sedimen)"},{"id":"1107","mr_state":["X","Multirule Lekosit (Sedimen)|tidak berlaku [Result not numeric]",[],{"title":"Multirule Lekosit (Sedimen)","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"463","test_name":"Lekosit (Sedimen)"},{"id":"1108","mr_state":["X","Multirule Epitel (Sedimen)|tidak berlaku [Result not numeric]",[],{"title":"Multirule Epitel (Sedimen)","sub_title":"Tidak berlaku, karena hasil bukan numerik"}],"validation":"Y","test_id":"464","test_name":"Epitel (Sedimen)"},{"id":"1109","mr_state":["X","Multirule belum berlaku [Hasil Qualitative] ",[]],"validation":"Y","test_id":"465","test_name":"Kristal (Sedimen)"},{"id":"1110","mr_state":["X","Multirule belum berlaku [Hasil Qualitative] ",[]],"validation":"Y","test_id":"466","test_name":"Silinder (Sedimen)"},{"id":"1111","mr_state":["X","Multirule belum berlaku [Hasil Qualitative] ",[]],"validation":"Y","test_id":"467","test_name":"Lain-lain (Sedimen)"},{"id":"1112","mr_state":["X","Multirule belum berlaku [Hasil Qualitative] ",[]],"validation":"Y","test_id":"938","test_name":"Panel Profil Lemak"},{"id":"1113","mr_state":["Y","Multirule Cholesterol|terpenuhi [Normal, CHOD PAP]",[],{"title":"Multirule Cholesterol","sub_title":"Terpenuhi, Cholesterol untuk kondisi Normal dengan methode CHOD PAP tidak memiliki reflex test."}],"validation":"Y","test_id":"939","test_name":"Cholesterol"},{"id":"1114","mr_state":["Y","Multirule Trigliserida|terpenuhi [Normal, GPO PAP]",[],{"title":"Multirule Trigliserida","sub_title":"Terpenuhi, Trigliserida untuk kondisi Normal dengan methode GPO PAP tidak memiliki reflex test."}],"validation":"Y","test_id":"940","test_name":"Trigliserida"},{"id":"1115","mr_state":["Y","Multirule HDL Cholesterol , Reflex Test terpenuhi",[],{"title":"Multirule HDL Cholesterol","overlimit":false,"sub_title":"HDL Cholesterol hasil Low","argument_1":[{"px":"Cholesterol","pxID":"4667","reflexID":"348","is_ok":true,"is_show_mandatory":true,"condition":"Normal","conditionID":2,"note":"hasil Normal, Argument 1 Normal","result":"Normal","is_ok_argument":true,"mandatory":[]}]}],"validation":"Y","test_id":"941","test_name":"HDL Cholesterol"},{"id":"1116","mr_state":["Y","Multirule LDL Cholesterol Direct|terpenuhi [Normal, DIRECT  CHOD  PAP]",[],{"title":"Multirule LDL Cholesterol Direct","sub_title":"Terpenuhi, LDL Cholesterol Direct untuk kondisi Normal dengan methode DIRECT  CHOD  PAP tidak memiliki reflex test."}],"validation":"Y","test_id":"942","test_name":"LDL Cholesterol Direct"},{"id":"1117","mr_state":["Y","Multirule LDL\/HDL Chol. Ratio|terpenuhi [Normal, CALCULATION ]",[],{"title":"Multirule LDL\/HDL Chol. Ratio","sub_title":"Terpenuhi, LDL\/HDL Chol. Ratio untuk kondisi Normal dengan methode CALCULATION  tidak memiliki reflex test."}],"validation":"Y","test_id":"943","test_name":"LDL\/HDL Chol. Ratio"},{"id":"1118","mr_state":["X","Multirule belum berlaku [Hasil Qualitative] ",[]],"validation":"Y","test_id":"972","test_name":"Panel Creatinin"},{"id":"1119","mr_state":["X","Multirule Serum Creatinin , Reflex Test  tidak ditemukan [High, ENZYMATIC]",[],{"title":"Multirule Serum Creatinin","overlimit":false,"sub_title":"Tidak berlaku, karena Serum Creatinin dengan kondisi High, tidak memiliki Argument 1"}],"validation":"Y","test_id":"973","test_name":"Serum Creatinin"},{"id":"1120","mr_state":["Y","Multirule eGFR , Reflex Test terpenuhi",[],{"title":"Multirule eGFR","overlimit":false,"sub_title":"eGFR hasil Low","argument_1":[{"px":"Serum Creatinin","pxID":"4690","reflexID":"313","is_ok":true,"is_show_mandatory":true,"condition":"High","conditionID":3,"note":"hasil High, Argument 1 High","result":"High","is_ok_argument":true,"mandatory":[{"reflexID":"313","px":"Asam Urat","condition":"High","is_display":true,"result":"High","is_ok":true}]}]}],"validation":"Y","test_id":"974","test_name":"eGFR"},{"id":"1121","mr_state":["Y","Multirule Asam Urat , Reflex Test terpenuhi",[],{"title":"Multirule Asam Urat","overlimit":false,"sub_title":"Asam Urat hasil High","argument_1":[{"px":"Serum Creatinin","pxID":"4690","reflexID":"314","is_ok":true,"is_show_mandatory":true,"condition":"High","conditionID":3,"note":"hasil High, Argument 1 High","result":"High","is_ok_argument":true,"mandatory":[]}]}],"validation":"Y","test_id":"976","test_name":"Asam Urat"},{"id":"1122","mr_state":["Y","Multirule Glukosa Darah Puasa|terpenuhi [Normal, HEXOKINASE]",[],{"title":"Multirule Glukosa Darah Puasa","sub_title":"Terpenuhi, Glukosa Darah Puasa untuk kondisi Normal dengan methode HEXOKINASE tidak memiliki reflex test."}],"validation":"Y","test_id":"1003","test_name":"Glukosa Darah Puasa"}]