{"T_SamplingSoID": 316539, "T_SamplingSoFlagDoctorInOffice": "N", "T_SamplingSoT_OrderHeaderID": 10, "T_SamplingSoT_TestID": 2352, "T_SamplingSoProcessDate": "2024-05-07", "T_SamplingSoProcessTime": "11:15:07", "T_SamplingSoProcessUserID": 1529, "T_SamplingSoFlag": "V", "T_SamplingSoDoneDate": "2024-05-07", "T_SamplingSoDoneTime": "11:15:35", "T_SamplingSoDoneUserID": 1529, "T_SamplingSoVerifyDate": "2024-05-07", "T_SamplingSoVerifyTime": "11:17:13", "T_SamplingSoVerifyUserID": 1529, "T_SamplingSoFlagSend": "N", "T_SamplingSoSendAdmDate": null, "T_SamplingSoSendAdmTime": null, "T_SamplingSoSendAdmUserID": null, "T_SamplingSoReceiveAdmDate": null, "T_SamplingSoReceiveAdmTime": null, "T_SamplingSoReceiveAdmUserID": null, "T_SamplingSoCreated": "2024-05-07 10:58:17", "T_SamplingSoLastUpdated": "2024-05-07 11:17:13", "T_SamplingSoUserID": 1529, "T_SamplingSoIsDone": "N"}