{"T_SamplingSoID": 316635, "T_SamplingSoFlagDoctorInOffice": "N", "T_SamplingSoT_OrderHeaderID": 65, "T_SamplingSoT_TestID": 2221, "T_SamplingSoProcessDate": "2024-05-20", "T_SamplingSoProcessTime": "16:50:22", "T_SamplingSoProcessUserID": 1535, "T_SamplingSoFlag": "D", "T_SamplingSoDoneDate": "2024-05-20", "T_SamplingSoDoneTime": "16:50:31", "T_SamplingSoDoneUserID": 1535, "T_SamplingSoVerifyDate": null, "T_SamplingSoVerifyTime": null, "T_SamplingSoVerifyUserID": null, "T_SamplingSoFlagSend": "N", "T_SamplingSoSendAdmDate": null, "T_SamplingSoSendAdmTime": null, "T_SamplingSoSendAdmUserID": null, "T_SamplingSoReceiveAdmDate": null, "T_SamplingSoReceiveAdmTime": null, "T_SamplingSoReceiveAdmUserID": null, "T_SamplingSoCreated": "2024-05-20 16:50:22", "T_SamplingSoLastUpdated": "2024-05-20 16:50:31", "T_SamplingSoUserID": 1535, "T_SamplingSoIsDone": "N"}