{"T_SamplingSoID": 316656, "T_SamplingSoFlagDoctorInOffice": "N", "T_SamplingSoT_OrderHeaderID": 76, "T_SamplingSoT_TestID": 2239, "T_SamplingSoProcessDate": "2024-06-03", "T_SamplingSoProcessTime": "15:43:10", "T_SamplingSoProcessUserID": 1529, "T_SamplingSoFlag": "V", "T_SamplingSoDoneDate": "2024-06-03", "T_SamplingSoDoneTime": "15:43:17", "T_SamplingSoDoneUserID": 1529, "T_SamplingSoVerifyDate": "2024-06-03", "T_SamplingSoVerifyTime": "15:43:41", "T_SamplingSoVerifyUserID": 1529, "T_SamplingSoFlagSend": "N", "T_SamplingSoSendAdmDate": null, "T_SamplingSoSendAdmTime": null, "T_SamplingSoSendAdmUserID": null, "T_SamplingSoReceiveAdmDate": null, "T_SamplingSoReceiveAdmTime": null, "T_SamplingSoReceiveAdmUserID": null, "T_SamplingSoCreated": "2024-06-03 15:43:10", "T_SamplingSoLastUpdated": "2024-06-03 15:43:41", "T_SamplingSoUserID": 1529, "T_SamplingSoIsDone": "N"}